en	An authentication exception occurred.
und	Autentifikatsiyada xatolik.

en	Authentication credentials could not be found.
und	Autentifikatsiya ma'lumotlari topilmadi.

en	Authentication request could not be processed due to a system problem.
und	Tizimdagi muammo tufayli autentifikatsiya so'rovi bajarilmadi.

en	Invalid credentials.
und	Noto'g'ri ma'lumot.

en	Cookie has already been used by someone else.
und	Cookie faylini allaqachon kimdir ishlatgan.

en	Not privileged to request the resource.
und	Sizda ushbu manbani talab qilishga ruxsat yo'q..

en	Invalid CSRF token.
und	Noto'g'ri CSRF belgisi.

en	No authentication provider found to support the authentication token.
und	Haqiqiylikni tasdiqlovchi belgini qo'llab-quvvatlovchi biron bir autentifikatsiya provayderi topilmadi.

en	No session available, it either timed out or cookies are not enabled.
und	Sessiya topilmadi, muddati tugamadi yoki cookie-fayllar yoqilmagan.

en	No token could be found.
und	To'ken topilmadi.

en	Username could not be found.
und	Foydalanuvchi nomi topilmadi.

en	Account has expired.
und	Akkunt muddati tugagan.

en	Credentials have expired.
und	Autentifikatsiya ma'lumotlari muddati tugagan.

en	Account is disabled.
und	Akkunt o'chirilgan.

en	Account is locked.
und	Akkunt bloklangan.

en	Too many failed login attempts, please try again later.
und	Kirish urinishlari muvaffaqiyatsiz tugadi, keyinroq qayta urinib ko'ring.

en	Invalid or expired login link.
und	Kirish havolasi yaroqsiz yoki muddati tugagan.